set_name                                                    =   mag        !
set_rows                                                    =   11572      !
set_cols                                                    =   8757       !
set_hddr                                                    =   0          !
set_tail                                                    =   0          !
row_hddr                                                    =   0          !
row_tail                                                    =   0          !
col_hddr                                                    =   0          !
col_tail                                                    =   0          !
val_endi                                                    =   BIG ENDIAN !
val_frmt                                                    =   REAL*4     !
row_mult                                                    =   5.000000   !
row_addr                                                    =   -4206135.  !
col_mult                                                    =   5.000000   !
col_addr                                                    =   422375.0   !
val_mult                                                    =   1.000000   !
val_addr                                                    =   0.0000000E+00 !
val_minv                                                    =   -9.9999999E+26 !
val_maxv                                                    =   9.9999999E+26 !
val_null                                                    =              !
set_plat                                                    =   -0.6686574 !
set_plon                                                    =   3.089233   !
set_phdg                                                    =   3.141593   !
set_proj                                                    =   utm        !
